time since 2008-11-07 (weeks)

0 2 4 6 8 10 12 14 16 18 20 22 24

HEX8 ULD threshold value, ADC units

3700

3750

3800

3850

3900

3950

4000

4050

4100

1

10

210

HEX8 ULD thresholds for all 3072 crystal ends

time since 2008-11-07 (weeks)

0 2 4 6 8 10 12 14 16 18 20 22 24

HEX8 ULD difference to 2009-03-28, ADC units

-50 -40 -30 -20 -10 0 10 20 30 40 50

1

10

210

310

ULD thresholds variation for all 3072 crystal ends