hcaltransRMS1 Entries 6741 Mean 13.62 RMS 11.46

0 20 40 60 80 100 120 140 0 100 200 300 400 500 600

CalTransRms (TkrNumTracks == 1^{hcaltransRMS2}

Entries 1567 Mean 22.23 RMS 19.44

0 20 40 60 80 100 120 140 0 20 40 60 80 100 120

hcaltransRMS2

CalTransRms (TkrNumTracks == 2