h2 Entries 23931 Mean 99.48 RMS 20.78

0 20 40 60 80 100 120 140 160 180 200 0 200 400 600 800 1000

1200

-Tkr1ZDir*CalEnergyRaw^{hz2}_{Entries 23931}

Mean -0.9095 RMS 0.07618

-1 -0.9 -0.8 -0.7 -0.6 -0.5 -0.4 -0.3 -0.2 -0.1 -0

10

210

310 hz2 Entries 23931

Tkr1ZDir

-1 -0.95-0.9 -0.85-0.8 -0.75-0.7 -0.65-0.6-0.55-0.5 100 110 120 130 140 150 160 170 180 CalEnergyRaw:Tkr1ZDir

-1 -0.95-0.9 -0.85-0.8 -0.75-0.7 -0.65-0.6-0.55-0.5 100

120

140

160

180

CalEnergyRaw:Tkr1ZDir