h9 Entries 5320 Mean 231.3 RMS 32.61

0 50 100 150 200 250 300 350 400 450 500

1

10

210

CalEnergyRaw {TkrNumTracks == 1 && Tkr1Hits > 20 && GltTower == 3 && TMath::Abs((acos(Tkr1ZDir)*(180./3.14159))-180.) < 20}